delete FROM public.nostr_events WHERE pubkey='523936568abad8b990698ccf93b334c88732a516e320bd9fa89b23348e2b35f5';
delete FROM public.nostr_events WHERE pubkey='d0ca28a4a6a6b92ce7c461a05fd1dc1f4c56eb027060ee47aaf47f80ccb726c9';
delete FROM public.nostr_events WHERE pubkey='6980a4c4186bcfcc0c3c6e559ea2af45d2f823c9c8730c87375f46eca08f01fc';
delete FROM public.nostr_events WHERE pubkey='b665058f3d30393843fe42cc2883942f8f6f07f798ef083a56150e65a681e33d';
delete FROM public.nostr_events WHERE pubkey='d7111ee81f9842d94f76039c2f39812f0ef2866669a667405d98bce97cec5cea';
delete FROM public.nostr_events WHERE pubkey='c7b7616fd85ad758c82d036bfd89f5a8e94715d13f2ce31a96e7b4842c8d21dc';
delete FROM public.nostr_events WHERE pubkey='108dd90ebaa2fda616fe9fbf0c432dd8b22b8b7a11619add8f99ee8c466e77dd';
delete FROM public.nostr_events WHERE pubkey='9f03a16599162328a7800def0ba3bccc2bc108010700ce74ddcc4ff0659415d2';
delete FROM public.nostr_events WHERE pubkey='77ec57a6f6ebdfbdcf788e07c74e0e511b9fd6ce7cbc0ef0fcca64375613b4c3';
delete FROM public.nostr_events WHERE pubkey='e40fb4b5c2d76d32a7dec73c1d17458d426a511c4797945edd95ceeed24ece22';
delete FROM public.nostr_events WHERE pubkey='9eff1cd0b11f6c7e060df265236f7f2b655f04a84676070649685f36b990dcce';
delete FROM public.nostr_events WHERE pubkey='6b921f7285ce3aedf37fe4d3f8917073db914eca0e6b860d6c048721789337da';
delete FROM public.nostr_events WHERE pubkey='767d979533de5439ef592e9870972dd6b01e3ecf062e33e4fa5eec5b573085f6';
delete FROM public.nostr_events WHERE pubkey='5e46c7d5e0725eaa34e36512ca05b9fc3381e7ada31027d9c4323719856bab40';
delete FROM public.nostr_events WHERE pubkey='b5d6c41bf439ff4c365fd8179d5c3a4a2e2ed14c2ab0528b0bf9319b86fdaa26';
delete FROM public.nostr_events WHERE pubkey='1cbcf82feeb1063fc009d73b2e1b66b57a4bc046890140b060d89cb0ae271a71';
delete FROM public.nostr_events WHERE pubkey='2f45d70f34113acd39c71e12bfd9b4142fd1c1a4ff19cd9eae17cc8ac54ee9d5';
delete FROM public.nostr_events WHERE pubkey='5ab22f9bce1b00d157d5057495ad8e6ed2f1d95874a2946a822dae1ed5659a03';
delete FROM public.nostr_events WHERE pubkey='978f440dd1f933973fcfae788016d9613f6cd08858dc79e7982f819fbfedd762';
delete FROM public.nostr_events WHERE pubkey='0fbd7e314cff4bf18edae07f7b8a2501b584af2ddfe5744bb05c027648984102';
delete FROM public.nostr_events WHERE pubkey='e231ed6e0952a78f2352260a4cf8440ff0b7ac7c17d5c680056690fbc2561718';
delete FROM public.nostr_events WHERE pubkey='ed2ca2e0b30711201e8e109d0c92e30e3d54db5dc4c3062b776352ea0ef4a101';
delete FROM public.nostr_events WHERE pubkey='827c340322440427d47f3518c603cfbe30277d206832853a1acb0c3f545dca77';
delete FROM public.nostr_events WHERE pubkey='651581d9df0d68acc3616c5eb50c57800b00d781fc9d48f69d2388b4b0eca1e8';
delete FROM public.nostr_events WHERE pubkey='38fc9e7607eccdcc6c730d7deec3ff479d7e408cec1209889787dd9fe62b941b';
delete FROM public.nostr_events WHERE pubkey='f2fe23924b113682dc8599837dcf73d76130d5b5a31360136accb45da38662b1';
delete FROM public.nostr_events WHERE pubkey='d8cacab4b55d1332b509d36fd905da519b6a115ea043d76ae74b52e2fa3cec8c';
delete FROM public.nostr_events WHERE pubkey='8bfb7929f74105426eae6c242ed1f58589d81f4c40a03ac41900f60eff0003bd';
delete FROM public.nostr_events WHERE pubkey='6b2681089e5161e7a7fc9a479ce8824a8c706c43479aa18be98b8b9e7c0e7133';
delete FROM public.nostr_events WHERE pubkey='c39848ed837b7d8e753e99970ab653f0a7bd3157b16ff96fdc36199aee389df0';
delete FROM public.nostr_events WHERE pubkey='9df4c3d59ca49b9dd068ad2245ccadacc96f76c84f09df7f396688f7f241f452';
delete FROM public.nostr_events WHERE pubkey='1360a5e1b7f4e575a743aa3c0d987b8a6d2da12c5d2a98ebaec3ee21c42c3f7d';
delete FROM public.nostr_events WHERE pubkey='58d9f3ef9baafe180c740f3e6876b32196ceeb381a75df05435ce39a06f549e1';
delete FROM public.nostr_events WHERE pubkey='1a0ce86ad5cf426a06f33102a97c9d7aa506917986076532871a3169d04f5da5';
delete FROM public.nostr_events WHERE pubkey='9142b56ab1efe4c15d6b46f3c24b1d90f20c2c260331f6ec63f8783ed100b4e2';
delete FROM public.nostr_events WHERE pubkey='bbccb2f340a82c4e5da448bdff2303d73a72f99c0fe90e68065e67dfd4e014be';
delete FROM public.nostr_events WHERE pubkey='6200cb6d8a73744d6eed6dcf947c8d03a0c5b96bbad842eea53d35afcb3b00e1';
delete FROM public.nostr_events WHERE pubkey='ebf40024f0cd52d75515b27906c99110ed8c69ac3eea34ffb80afc0f666da006';
delete FROM public.nostr_events WHERE pubkey='17d67b806caabb843a6294da5527728d891faefb44f995341b4e4897375d865f';
delete FROM public.nostr_events WHERE pubkey='7df4d07ab5f03b9c76b827b9caba6f4ca6f29173c5343bf1359ac68bfc941e52';
delete FROM public.nostr_events WHERE pubkey='fc8d2ab484d5eb980d4558281c6dbc3f2c46b473bf6e19c8320e28c50b15ec14';
delete FROM public.nostr_events WHERE pubkey='7cc9d226356ead7abe8da0f85207cb3b3a71ae1b18982347a497e0d65cc2af38';
delete FROM public.nostr_events WHERE pubkey='ac6fb5603d170d8bc186db1454ca17691259af62ac4b9f71bace9bdfeca18d35';
delete FROM public.nostr_events WHERE pubkey='5c2d44c0bbdbb07417298de68dbbac2a10fa29380e55e5fe41c29e38f5316d53';
delete FROM public.nostr_events WHERE pubkey='4d39bbf0aac16c133df50162006a21db5342640a90eebd6cf92471df2c6bd7af';
delete FROM public.nostr_events WHERE pubkey='e4bcd386569d65a3e0e1c4eb579448d5e8e072f67f385b785362b90872641c48';
delete FROM public.nostr_events WHERE pubkey='360d8a660a871b9a2a675952a6efc772f088f33ea89d0d7ada3aed5a95638c4c';
delete FROM public.nostr_events WHERE pubkey='998aeda18a569898f6bde5163c7514fce96ec0dc79bcc1258453642dd49e5c53';
delete FROM public.nostr_events WHERE pubkey='7c370cac17bfadaf7900e84585ae9d0ae2b39fe6db5c02fa79acad82d6a051ab';
delete FROM public.nostr_events WHERE pubkey='64078e0f2cb0ac606de900e614f9508410e90e47c6371594c46fe3efdb990a07';
delete FROM public.nostr_events WHERE pubkey='bddd20682c86133a64af0b2daeeaabdc5a560dc647f980ff11af8ff2525a714e';
delete FROM public.nostr_events WHERE pubkey='c932850b56f145b28ceffefff4428e49b65930d9af41e9ed5c8aafe75f4e57b1';
delete FROM public.nostr_events WHERE pubkey='1108c12e5fd56201cedd80b345bf6dd9e5aa5dd07788f2c101adaf185f7a9acf';
delete FROM public.nostr_events WHERE pubkey='39494d8cbfe8e89a34e32ecf5795460c59a17de7a4930abc7effc056c07daaed';
delete FROM public.nostr_events WHERE pubkey='532d70c44d0f83f06cfaf37969d93796d003a019ed7393b89f0ade457a8ec5bd';
delete FROM public.nostr_events WHERE pubkey='e1de34cd44a6399428a04921d92e0ea09c33d98bd8b5e1b99c661b08c1d0cd7e';
delete FROM public.nostr_events WHERE pubkey='5e9f6ce96414577ededeb0f441dc6fc3ae20a6393221fdd84616e49403ae5f6c';
delete FROM public.nostr_events WHERE pubkey='8ddc4c293a5c0c0e5563d99e1f8db785b4006a1541a2d6ae14b40da30a49b39a';
delete FROM public.nostr_events WHERE pubkey='03145b709193781ee4f1578a1362df79d955fcb19303ec163a3493730808d382';
delete FROM public.nostr_events WHERE pubkey='dd8f6db60e79cbdc75969f0272be89ba893f36b9e9e4b889b19fc527527bd52f';
delete FROM public.nostr_events WHERE pubkey='55a0b841bda5401e4ce2b7c25ccbdf1dadc9c5bffa37a794d436207594d470e2';
delete FROM public.nostr_events WHERE pubkey='4ed1034c7d12bb5a57ee24e520e6129fc6ec47d5abd3d65075a14cbcd578f66e';
delete FROM public.nostr_events WHERE pubkey='7d6167ee50c4dd69be0253bf1dc6551ae5cfe417ccfdd3e5564eb56586f8f141';
delete FROM public.nostr_events WHERE pubkey='585e1520ed940cddafdcfcdc52cf123e735fdb61e70171035580989d279dfc1a';
delete FROM public.nostr_events WHERE pubkey='6f3fd5bf8a639a6d547d7e82091924f82a5a982b358e416597db1c661ffdd071';
delete FROM public.nostr_events WHERE pubkey='8ae08b03c9788a2a8907a5312aa045f7eccdf81f876edb4b4c5ccc88480152bd';
delete FROM public.nostr_events WHERE pubkey='f7e14f7406ce637428008fa06aade0650e40cb82432f17940a1c71fb462921ef';
delete FROM public.nostr_events WHERE pubkey='b86133a4ee1d55fee56f022672246117b6c0b29d8ee021652a5168f7ab8d40e5';
delete FROM public.nostr_events WHERE pubkey='57119d110ea526bd7b7c0d6ca82f23173cd1b7610833b1ac61e8f62af7608691';
delete FROM public.nostr_events WHERE pubkey='d4b4bc894144ff33cddf71f979c96ec40863b4213937590f3911f2632badf90f';
delete FROM public.nostr_events WHERE pubkey='eedd7843d350f2a5e676b4c14fba2c4dfc4cf904df930e351d4fa23d089a0268';
delete FROM public.nostr_events WHERE pubkey='513bf2d63f100ef82a3fa331701d880ffc9568e80e1f3ba4ad6a27f6017d9155';
delete FROM public.nostr_events WHERE pubkey='4d484fd4b212fb528d778d94756ea3b083335dc0f573bc3bca1aafe814a21b14';
delete FROM public.nostr_events WHERE pubkey='6c5fc2d7d9d583e725d0dd8207449197c00db69e12bc7a00e133f47e95ddb916';
delete FROM public.nostr_events WHERE pubkey='bf2d3b436a8c7bfe994cf5605e3803ff8f7488e69772ea206e218622f568b3cb';
delete FROM public.nostr_events WHERE pubkey='25e3d76839e78ad1d2bdb825ef1b1b46d11819fc6c4ef986b0a90a6819d4e9cc';
delete FROM public.nostr_events WHERE pubkey='4eee6b839a11f062ca0fcc10d43aa2b738d4f452c0dafcdcdec4cd0c9d94a4c4';
delete FROM public.nostr_events WHERE pubkey='2c9437ae55201ce263508c32227bf7ed6c9eb9be0390d312f10e0c3d5b32fd71';
delete FROM public.nostr_events WHERE pubkey='caa3fd94e17b2460ddf5884130de9afcad318da57a77906f0ea59285f375854d';
delete FROM public.nostr_events WHERE pubkey='321ed78037f3a92f1c7ec17fc7c247c393c4da3d1733eba3b7f494e132001fb8';
delete FROM public.nostr_events WHERE pubkey='b3acb6a12f37e6bf84611e24c67a27897552766cf04b405e81c756ec3c93f81a';
delete FROM public.nostr_events WHERE pubkey='7c21228bb34690250dc1e9184245f50f22cfdcb6ea4027a3ba0c76725fa6bd15';
delete FROM public.nostr_events WHERE pubkey='1109f5a5008d7fbf7ddce16391319eceb34208cd4c9f321041664667f30ac27f';
delete FROM public.nostr_events WHERE pubkey='623c3b8b0a586852260a887f1478ef79eec2d7da7cd4de6ce41418a23b864f40';
delete FROM public.nostr_events WHERE pubkey='9564d00751a6957251818225bff6bf689a7fa9bc9a582c3e52497a802c06729b';
delete FROM public.nostr_events WHERE pubkey='348f39f52b527f434e3a2ce8fbf492a1565af9e6aa4eb947575ab6185a65245d';
delete FROM public.nostr_events WHERE pubkey='9c892937157151ab5a677c3c1b76ca02bf367a6446d13e2cb6d5b2184e9d7f3a';
delete FROM public.nostr_events WHERE pubkey='ed5043c2826abaec0bffc0e977040c42aea4c33f773b19a822e0850f530b3bac';
delete FROM public.nostr_events WHERE pubkey='b51c9eea30c1a32fd36c918b3d24aea07d77880933a41ca7bb6e15bd204f1d51';
delete FROM public.nostr_events WHERE pubkey='2d96627da9c11bc3ff93d6491e6305e28906aeef897f7e13e9a7d955cc02c684';
delete FROM public.nostr_events WHERE pubkey='3ffea4b66a6a8bd8fa7e4c76413071d01f99a086f5638fdff8feb99180788206';
delete FROM public.nostr_events WHERE pubkey='b13c0b4b460f299d33d2ee7145a7ee739a5fd6bc74bdd2b86583f56415720abc';
delete FROM public.nostr_events WHERE pubkey='d17f4a879d92cd389100079d96e535df498416fa0bc90d436c2fba5a1f07706a';
delete FROM public.nostr_events WHERE pubkey='7a297add26af56ee454c4d5a287415f75a15d1b2e9cc33f04113d20bf943c6d4';
delete FROM public.nostr_events WHERE pubkey='fb1545fc81bae178fa449d923f5c4794388cced1b8f57cc043bfad38dc1b0148';
delete FROM public.nostr_events WHERE pubkey='cd5c30d9e45b9d6a6dac201493d98c899646b7bac7c0da454f2fc46a8fce173a';
delete FROM public.nostr_events WHERE pubkey='08bf6cd7a77f37ca87efd031dba741fceffe0376c6cae98718d7ca557e145516';
delete FROM public.nostr_events WHERE pubkey='1dcda506379320fa45133bee6678409b75263ea968258ed8d7ba8240c35a3176';
delete FROM public.nostr_events WHERE pubkey='a907dcc7d532f3fa40852d19006cc28f5905b051ff0125c17326abc022e07c93';
delete FROM public.nostr_events WHERE pubkey='642c2d2d1468d20c1c0a1fc2c8b87e29d5dad390b0325be274c4b403f7640f36';
delete FROM public.nostr_events WHERE pubkey='f7c51c1e04c6d189d7796ae7a807fb12ae26df5258a9824c28f2383d85266cda';
delete FROM public.nostr_events WHERE pubkey='5a98cb5bce89f6dd1c9f80fc3bef22a01f599e8fd2d7fd05ff5d80125f21d761';
delete FROM public.nostr_events WHERE pubkey='a0e67f46f460e52a755ede99e97d80eef0f961814113404d5853c351f64e0140';
delete FROM public.nostr_events WHERE pubkey='cc1ee21f4a1c69d554ba7baaf2cbf58f4c59686c0737109a2e95b876dec3b03d';
delete FROM public.nostr_events WHERE pubkey='b55cabc967bfad1045461ddfad6cd26f4da4a5bd77fb035a9faea085172a1023';
delete FROM public.nostr_events WHERE pubkey='29d6de3fe3dd8dda45ce626ab8a440a08d01327afee7c5686287c059d65426e8';
delete FROM public.nostr_events WHERE pubkey='9069364312fef951ec14d1f3b2fb9cd5397360b58165e852daccfa9a9a5a2311';
delete FROM public.nostr_events WHERE pubkey='8c270a24c57e537b1b1afbd5bab94a5e6ec6b0995d302b2e2cff30c63b44338b';
delete FROM public.nostr_events WHERE pubkey='c7ff0bc039def022f44996e4ab39aad1d47ef7c7bb1664bd461fa60497d075da';
delete FROM public.nostr_events WHERE pubkey='a5d2e4a5f9432c7748ca37feaa8aa5e99a99eaf4d8c96bd5e30b759c82748a9c';
delete FROM public.nostr_events WHERE pubkey='0b435e57eb65b5f9a71fcf895dc79f493b77ea4cdf3f0583441daae9fc1a37f2';
delete FROM public.nostr_events WHERE pubkey='350c7f67cc39fdd54496bdd036fe3e3eafb95dedaf5b7788e09612cb9c294a80';
delete FROM public.nostr_events WHERE pubkey='e3864d4018f51e67fcefb58205bea6d3883d00ec4743e11ea0fb0606f9df9af6';
delete FROM public.nostr_events WHERE pubkey='b0d67ba3bef0fc989c57cb6eac4120918f04969fc5d1b98187b0a248a54808a0';
delete FROM public.nostr_events WHERE pubkey='dcbc73b813bab07d2005298526fb86330e05dc1721cfdf93860e060033d6690d';
delete FROM public.nostr_events WHERE pubkey='47dc4c9cafeca2f38b62fab44095b0b308c55568b79e248a8711867467b67e97';
delete FROM public.nostr_events WHERE pubkey='baa2b90bbe59476a6fea3290dae9547bfc9bbfe1b9dd3eb54c1f10a6fa6bc4a8';
delete FROM public.nostr_events WHERE pubkey='7e464a117a4bfce8e3302d781428de38a4eee0d6ec1c9dc0f79587d7428abe5b';
delete FROM public.nostr_events WHERE pubkey='ae6f0bf8f1bf6af06a3b5f3e1f173890466bdd285e28b8f454d020b49860a6b3';
delete FROM public.nostr_events WHERE pubkey='78cb6d5a807e255fa2f6a96d2d5a1716a40a84b43c81b77ff942af5be146236e';
delete FROM public.nostr_events WHERE pubkey='dcc784a64bc808789e177b66fbed7d7fbe8c7ca5190ef51b2723d908c7f91125';
delete FROM public.nostr_events WHERE pubkey='02175d9e1768c65c640fd00f79feb67d24ec58ef1a46aeb5a41176f3bd323e88';
delete FROM public.nostr_events WHERE pubkey='9c33d18d76b69d3c97e7de88b22d13ab4ac06e2eac229d87c78066d5166c4be5';
